% ****** Start of file aipsamp.tex ******
%
%   This file is part of the AIP files in the AIP distribution for REVTeX 4.
%   Version 4.1 of REVTeX, October 2009
%
%   Copyright (c) 2009 American Institute of Physics.
%
%   See the AIP README file for restrictions and more information.
%
% TeX'ing this file requires that you have AMS-LaTeX 2.0 installed
% as well as the rest of the prerequisites for REVTeX 4.1
% 
% It also requires running BibTeX. The commands are as follows:
%
%  1)  latex  aipsamp
%  2)  bibtex aipsamp
%  3)  latex  aipsamp
%  4)  latex  aipsamp
%
% Use this file as a source of example code for your aip document.
% Use the file aiptemplate.tex as a template for your document.
\documentclass[rsi,amsmath,amssymb,floatfix,reprint
]{revtex4-1}

\usepackage{graphicx}% Include figure files
\graphicspath{./img/}

\usepackage{dcolumn}% Align table columns on decimal point
\usepackage{bm}% bold math
\usepackage[mathlines]{lineno}% Enable numbering of text and display math
%\linenumbers\relax % Commence numbering lines

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{mathptmx}
\usepackage{xcolor}
%\usepackage{siunitx}

\begin{document}

%\preprint{AIP/123-QED}

\title{Passive Stabilization of Optical Interferometers with Friction Dampers}

\author{Adrian Nugraha Utama}
\author{Jia Pern Neville Chen}%
\altaffiliation[Now at ]{Department of Physics, University of Illinois at Urbana-Champaign.}
\affiliation{Centre for Quantum Technologies, 3 Science Drive 2, Singapore 117543
}%

\author{Christian Kurtsiefer}
 \email{phyck@nus.edu.sg}
\affiliation{%
Department of Physics, National University of Singapore, 2 Science Drive 3, Singapore 117542
}%
\affiliation{Centre for Quantum Technologies, 3 Science Drive 2, Singapore 117543
}%

\date{\today}% It is always \today, today,
             %  but any date may be explicitly specified

\begin{abstract}
Optical interferometers rely on position stabilization and noise isolation. 
We report on a method of passive stabilization which reduces significantly noises from mechanical resonances of the mounts and actuators.
The method relies on placing a few thin and rigid metal strips across the interferometer mounts, creating a more rigid system supported by static friction in the small discursion regime, while also allowing for large actuator movements.
The simplicity and ease of the method allows for immediate application,
along with other noise reduction techniques, 
in systems with noisy environment.
\end{abstract}

\maketitle

\input{sections/intro.tex}
\input{sections/section02.tex}
\input{sections/section03.tex}
\input{sections/section04.tex}
\input{sections/section05.tex}
\input{sections/acknowledgements.tex}


\bibliography{bibfile.bib}% Produces the bibliography via BibTeX.

\end{document}
%
% ****** End of file aipsamp.tex ******
